\hypertarget{classDLighting}{
\section{DLighting Class Reference}
\label{d0/d11/classDLighting}\index{DLighting@{DLighting}}
}


{\ttfamily \#include $<$p\_\-spec.h$>$}

Inheritance diagram for DLighting:\begin{figure}[H]
\begin{center}
\leavevmode
\includegraphics[height=4.040404cm]{d0/d11/classDLighting}
\end{center}
\end{figure}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classDLighting_a4433d9811d3c1162b238e4c0abdf8a15}{DLighting} (\hyperlink{structsector__s}{sector\_\-t} $\ast$sector)
\end{DoxyCompactItemize}
\subsection*{Protected Member Functions}
\begin{DoxyCompactItemize}
\item 
\hyperlink{classDLighting_aeb17298f0a6858be3d69678851b6c8ac}{DLighting} ()
\end{DoxyCompactItemize}


\subsection{Constructor \& Destructor Documentation}
\hypertarget{classDLighting_a4433d9811d3c1162b238e4c0abdf8a15}{
\index{DLighting@{DLighting}!DLighting@{DLighting}}
\index{DLighting@{DLighting}!DLighting@{DLighting}}
\subsubsection[{DLighting}]{\setlength{\rightskip}{0pt plus 5cm}DLighting::DLighting (
\begin{DoxyParamCaption}
\item[{{\bf sector\_\-t} $\ast$}]{sector}
\end{DoxyParamCaption}
)}}
\label{d0/d11/classDLighting_a4433d9811d3c1162b238e4c0abdf8a15}
\hypertarget{classDLighting_aeb17298f0a6858be3d69678851b6c8ac}{
\index{DLighting@{DLighting}!DLighting@{DLighting}}
\index{DLighting@{DLighting}!DLighting@{DLighting}}
\subsubsection[{DLighting}]{\setlength{\rightskip}{0pt plus 5cm}DLighting::DLighting (
\begin{DoxyParamCaption}
{}
\end{DoxyParamCaption}
)\hspace{0.3cm}{\ttfamily  \mbox{[}protected\mbox{]}}}}
\label{d0/d11/classDLighting_aeb17298f0a6858be3d69678851b6c8ac}


The documentation for this class was generated from the following files:\begin{DoxyCompactItemize}
\item 
common/\hyperlink{p__spec_8h}{p\_\-spec.h}\item 
common/\hyperlink{p__lights_8cpp}{p\_\-lights.cpp}\end{DoxyCompactItemize}
