\hypertarget{connecthostport_8c}{
\section{libminiupnpc/connecthostport.c File Reference}
\label{d2/df7/connecthostport_8c}\index{libminiupnpc/connecthostport.c@{libminiupnpc/connecthostport.c}}
}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \hyperlink{connecthostport_8c_a8985baf2abfa78de85c53f6701b55d10}{connecthostport} (const char $\ast$host, unsigned short port)
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{connecthostport_8c_a8985baf2abfa78de85c53f6701b55d10}{
\index{connecthostport.c@{connecthostport.c}!connecthostport@{connecthostport}}
\index{connecthostport@{connecthostport}!connecthostport.c@{connecthostport.c}}
\subsubsection[{connecthostport}]{\setlength{\rightskip}{0pt plus 5cm}int connecthostport (
\begin{DoxyParamCaption}
\item[{const char $\ast$}]{host, }
\item[{unsigned short}]{port}
\end{DoxyParamCaption}
)}}
\label{d2/df7/connecthostport_8c_a8985baf2abfa78de85c53f6701b55d10}
