\hypertarget{upnperrors_8c}{
\section{libminiupnpc/upnperrors.c File Reference}
\label{d3/d55/upnperrors_8c}\index{libminiupnpc/upnperrors.c@{libminiupnpc/upnperrors.c}}
}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
const char $\ast$ \hyperlink{upnperrors_8c_a3f4432830e901e805d19b6738ae1b03e}{strupnperror} (int err)
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{upnperrors_8c_a3f4432830e901e805d19b6738ae1b03e}{
\index{upnperrors.c@{upnperrors.c}!strupnperror@{strupnperror}}
\index{strupnperror@{strupnperror}!upnperrors.c@{upnperrors.c}}
\subsubsection[{strupnperror}]{\setlength{\rightskip}{0pt plus 5cm}const char$\ast$ strupnperror (
\begin{DoxyParamCaption}
\item[{int}]{err}
\end{DoxyParamCaption}
)}}
\label{d3/d55/upnperrors_8c_a3f4432830e901e805d19b6738ae1b03e}
