\hypertarget{upnperrors_8h}{
\section{libminiupnpc/upnperrors.h File Reference}
\label{d4/d72/upnperrors_8h}\index{libminiupnpc/upnperrors.h@{libminiupnpc/upnperrors.h}}
}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
LIBSPEC const char $\ast$ \hyperlink{upnperrors_8h_a9ae5a7b932ec3fd12f2575374d13a9e6}{strupnperror} (int err)
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{upnperrors_8h_a9ae5a7b932ec3fd12f2575374d13a9e6}{
\index{upnperrors.h@{upnperrors.h}!strupnperror@{strupnperror}}
\index{strupnperror@{strupnperror}!upnperrors.h@{upnperrors.h}}
\subsubsection[{strupnperror}]{\setlength{\rightskip}{0pt plus 5cm}LIBSPEC const char$\ast$ strupnperror (
\begin{DoxyParamCaption}
\item[{int}]{err}
\end{DoxyParamCaption}
)}}
\label{d4/d72/upnperrors_8h_a9ae5a7b932ec3fd12f2575374d13a9e6}
