\hypertarget{classtestupnpigd_1_1handler__class}{
\section{testupnpigd::handler\_\-class Class Reference}
\label{d8/d98/classtestupnpigd_1_1handler__class}\index{testupnpigd::handler\_\-class@{testupnpigd::handler\_\-class}}
}
\subsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
def \hyperlink{classtestupnpigd_1_1handler__class_aa526fd89619c55a4d5793967382c187e}{do\_\-GET}
\end{DoxyCompactItemize}


\subsection{Member Function Documentation}
\hypertarget{classtestupnpigd_1_1handler__class_aa526fd89619c55a4d5793967382c187e}{
\index{testupnpigd::handler\_\-class@{testupnpigd::handler\_\-class}!do\_\-GET@{do\_\-GET}}
\index{do\_\-GET@{do\_\-GET}!testupnpigd::handler_class@{testupnpigd::handler\_\-class}}
\subsubsection[{do\_\-GET}]{\setlength{\rightskip}{0pt plus 5cm}def testupnpigd::handler\_\-class::do\_\-GET (
\begin{DoxyParamCaption}
\item[{}]{self}
\end{DoxyParamCaption}
)}}
\label{d8/d98/classtestupnpigd_1_1handler__class_aa526fd89619c55a4d5793967382c187e}


The documentation for this class was generated from the following file:\begin{DoxyCompactItemize}
\item 
libminiupnpc/\hyperlink{testupnpigd_8py}{testupnpigd.py}\end{DoxyCompactItemize}
