\hypertarget{receivedata_8c}{
\section{libminiupnpc/receivedata.c File Reference}
\label{df/d5f/receivedata_8c}\index{libminiupnpc/receivedata.c@{libminiupnpc/receivedata.c}}
}
\subsection*{Functions}
\begin{DoxyCompactItemize}
\item 
int \hyperlink{receivedata_8c_a62e329440925d8bbf46ec9f4b462d047}{receivedata} (int socket, char $\ast$data, int length, int timeout)
\end{DoxyCompactItemize}


\subsection{Function Documentation}
\hypertarget{receivedata_8c_a62e329440925d8bbf46ec9f4b462d047}{
\index{receivedata.c@{receivedata.c}!receivedata@{receivedata}}
\index{receivedata@{receivedata}!receivedata.c@{receivedata.c}}
\subsubsection[{receivedata}]{\setlength{\rightskip}{0pt plus 5cm}int receivedata (
\begin{DoxyParamCaption}
\item[{int}]{socket, }
\item[{char $\ast$}]{data, }
\item[{int}]{length, }
\item[{int}]{timeout}
\end{DoxyParamCaption}
)}}
\label{df/d5f/receivedata_8c_a62e329440925d8bbf46ec9f4b462d047}
